% LaTeX class specification.  Any changes will not appear in the final version
\documentclass[12pt,letterpaper, reqno]{aimpl}

% The problem list should be arranged like a research paper, with
% introductory material followed be one or more main sections.
% Do not divide the sections into subsections.
% Each section could have its own introductory material.
% The main part of each section is a "problem block" which has the format
% [[see elsewhere for more documentation]]

% New macros.
% If at all possible, please do not define any new macros.  Each
% macro you introduce has the potential to cause problems with the
% long-term maintenance of the problem list.

% removed \n from join and moved it to MACROS in app.js
\newcommand{\Cat}{{\rm Cat}}
\newcommand{\A}{\mathcal A}
\newcommand{\freestar}{ \framebox[7pt]{$\star$} }

\begin{document}
\title{new test}
\author{Edited by }

\urlstub{newtest}

\maketitle

test 2


\section{First test section}

The intro



\begin{problemblock}Suppose $f:\R\to \C$ satisfies $f(x) \ll x^{-3}$.

\begin{problem}[.1] What continuity properties must $\hat{f}$ have? \end{problem}




\end{problemblock}



\section{another test section}







\begin{thebibliography}{99}

\end{thebibliography}


\end{document}
